\documentclass[10pt,a4paper]{article}
\usepackage[utf8]{inputenc}
\usepackage{amsmath}
\usepackage{amsfonts}
\usepackage{amssymb}
\author{jm}
\title{Links}

\usepackage{hyperref}

\begin{document}
\section{IO Link Messsysteme}
	
• \href {https://mall.industry.siemens.com/mall/en/WW/Catalog/Products/10098311}
		{SIRIUS 3UG48 monitoring relays for stand-alone installation for IO-Link} \\
		
• \href {https://mall.industry.siemens.com/mall/de/ekat/Catalog/Products/10121828?tree=CatalogTree}
		{Stromüberwachung}
\end{document}
